.000 .048 .096 .144 .192 .240

.000

.032

.064

Umin= -.84 Umax= .84 Vmin= -.75 Vmax= .75 .6

.6

.000 .048 .096 .144 .192 .240

.000

.032

.064

.096

Umin= -.81 Umax= .81 Vmin= -.76 Vmax= .77 .6