54.00 60.40 66.80 73.20 79.60 86.00 .00

2.00

4.00

6.00

8.00

-2.0

-1.0

1.0

Min=-3.70 Max= 4.01 Inc= .500

(a) model uprt (m/s) at t=8000.0 s (2:13:20)

54.00 60.40 66.80 73.20 79.60 86.00 .00

2.00

4.00

6.00

8.00

-1.0

.5

1.0

Min=-1.96 Max= 1.62 Inc= .250

(b) model wprt (m/s) at t=8000.0 s (2:13:20)

54.00 60.40 66.80 73.20 79.60 86.00 .00

2.00

4.00

6.00

8.00

-3.0

-2.0

-2.0

-1.0

-1.0

-1.0

-1.0

.0

.0

.0

.0

.0

1.0

1.0

1.0

1.0

1.0

2.0

2.0

2.0

3.0

3.0

Min=-3.94 Max= 4.09 Inc= .500

(c) analytical uprt (m/s) at t=8000.0 s (2:13:20)

54.00 60.40 66.80 73.20 79.60 86.00 .00

2.00

4.00

6.00

8.00

-1.5

-1.0

-1.0

-1.0

-.5-.5

-.5

-.5

-.5

.5

.5

.5

.5

.5

.5

1.0

1.0

1.5

Min=-2.02 Max= 1.64 Inc= .250

(d) analytical wprt (m/s) at t=8000.0 s (2:13:20)

54.00 60.40 66.80 73.20 79.60 86.00 .00

2.00

4.00

6.00

8.00

-.8

-.6

-.4

-.4

-.2

-.2

-.2

.0

.0

.0

.0

.0

.0

.0

.0

.0

.0

.2

.2

.2

.2

.2

.2

.4

.4

Min=-1.07 Max= .777 Inc= .100

(e) difference uprt (m/s) at t=8000.0 s (2:13:20)

mwav4a ARPS V.4.0 output, generated by ARPSPLT V.4.0 based on ZXPLOT

54.00 60.40 66.80 73.20 79.60 86.00 .00

2.00

4.00

6.00

8.00

-.2

-.2

-.1

-.1

-.1

-.1

.1

.1

.1

.2

.2

.2

Min=-.248 Max= .317 Inc= .500E-01

(f) difference wprt (m/s) at t=8000.0 s (2:13:20)