0 16 32 48 64 0

16

32

48

64

1.0

Wmin=-2.26 Wmax=3.21 Interval=.500

.0

.0 u-v and w (m/s) at t=1hr at z=0.25km

Umin=-18.36 Umax=3.62 Vmin=-15.01 Vmax=9.05

20.0

20.0

0 16 32 48 64 0

16

32

48

64

Wmin=-6.95 Wmax=22.3 Interval= 2.0 u-v and w (m/s) at t=1 hr at z=4.0km

Umin=-13.82 Umax=11.04 Vmin=-2.49 Vmax=24.46

10.0

10.0