56.00 72.00 88.00 104.00 120.00 136.00

0.00

2.00

4.00

6.00

8.00

10.00

12.00

Min=-.325E-01 Max=0.265E-01 Inc=0.500E-02

(a) model uprt (m/s) at t=30000.0 s (8:20:00)

56.00 72.00 88.00 104.00 120.00 136.00

0.00

2.00

4.00

6.00

8.00

10.00

12.00

Min=-.324E-02 Max=0.399E-02 Inc=0.500E-03

(b) model wprt (m/s) at t=30000.0 s (8:20:00)

56.00 72.00 88.00 104.00 120.00 136.00

0.00

2.00

4.00

6.00

8.00

10.00

12.00

Min=-.415E-01 Max=0.333E-01 Inc=0.500E-02

(c) analytical uprt (m/s) at t=30000.0 s (8:20:00)

56.00 72.00 88.00 104.00 120.00 136.00

0.00

2.00

4.00

6.00

8.00

10.00

12.00

Min=-.339E-02 Max=0.422E-02 Inc=0.500E-03

(d) analytical wprt (m/s) at t=30000.0 s (8:20:00)

56.00 72.00 88.00 104.00 120.00 136.00

0.00

2.00

4.00

6.00

8.00

10.00

12.00

Min=-.845E-02 Max=0.123E-01 Inc=0.500E-02

(e) difference uprt (m/s) at t=30000.0 s (8:20:00)

mwav1a ARPS V.4.0 output, generated by ARPSPLT V.4.0 based on ZXPLOT

56.00 72.00 88.00 104.00 120.00 136.00

0.00

2.00

4.00

6.00

8.00

10.00

12.00

Min=-.135E-02 Max=0.164E-02 Inc=0.500E-03

(f) difference wprt (m/s) at t=30000.0 s (8:20:00)